Table I. Median Normalized Time Results. Normalized time is the running time of each algorithm for a particular sample size and network divided by the corresponding running time of MMHC . The first term in the parentheses is the number of networks the algorithm terminated on and used in calculating the median for each algorithm and the second is the number of networks the algorithm hit the 2 day time threshold and was stopped. Median normalized time values smaller than one correspond to an algorithm with faster running times than MMHC . The * reminds the reader that the Optimal Reinsertion (OR) algorithms running time was set to be 1 or 2 times that of MMHC . Also, recall the GES implementation did not contain all optimizations described by the original authors.

Median Normalized Times Sample Size (SS) Average Algorithm 500 1000 5000 Over SS

MMHC 1.00 (22/ 0) 1.00 (22/ 0) 1.00 (22/ 0) 1.00 OR1 k=5 1.18 (19/ 0) 1.15 (18/ 0) 1.12 (17/ 0) 1.15∗ OR1 k=10 1.15 (19/ 0) 1.17 (18/ 0) 1.14 (16/ 0) 1.15∗ OR1 k=20 1.18 (19/ 0) 1.18 (18/ 0) 1.13 (16/ 0) 1.16∗ OR2 k=5 2.25 (19/ 0) 2.19 (18/ 0) 2.14 (16/ 0) 2.20∗ OR2 k=10 2.32 (18/ 0) 2.17 (18/ 0) 2.13 (16/ 0) 2.21∗ OR2 k=20 2.36 (18/ 0) 2.26 (18/ 0) 2.16 (16/ 0) 2.26∗ SC k=5 5.99 (21/ 0) 6.51 (22/ 0) 4.68 (18/ 2) 5.73 SC k=10 9.37 (13/ 0) 11.69 (13/ 0) 7.82 (13/ 0) 9.63 GS 5.07 (20/ 2) 4.10 (20/ 2) 2.98 (20/ 2) 4.05 PC 1.87 (18/ 4) 1.69 (18/ 4) 1.29 (20/ 2) 1.62 TPDA 10.25 (21/ 1) 5.17 (21/ 1) 0.56 (22/ 0) 5.33 GES 341.20 ( 7/15) 135.65 ( 6/16) 33.46 ( 6/16) 170.10

B11_median_time_results.tex; 5/08/2005; 15:58; p.1