Table IV. Median Normalized Structural Hamming Distance Results. Normalized Structural Hamming Distance (SHD) is the SHD of each algorithm for a particular sample size and network divided by MMHC ’s SHD on the same sample size and network. The term in parentheses is the number of networks the algorithm in the median calculation. Median normalized SHD values greater than one correspond to an algorithm with more structural errors than MMHC .

Median Normalized Structural Hamming Distance Sample Size (SS) Average Algorithm 500 1000 5000 Over SS

MMHC 1.00 (22) 1.00 (22) 1.00 (22) 1.00 OR1 k=5 1.24 (19) 1.40 (18) 1.71 (17) 1.45 OR1 k=10 1.29 (19) 1.36 (18) 1.82 (16) 1.49 OR1 k=20 1.31 (19) 1.46 (18) 1.84 (16) 1.54 OR2 k=5 1.13 (19) 1.37 (18) 1.66 (16) 1.39 OR2 k=10 1.14 (18) 1.30 (18) 1.63 (16) 1.36 OR2 k=20 1.20 (18) 1.29 (18) 1.70 (16) 1.40 SC k=5 1.12 (21) 1.18 (22) 1.53 (18) 1.27 SC k=10 1.24 (13) 1.31 (13) 1.41 (13) 1.32 GS 1.20 (20) 1.36 (20) 1.51 (20) 1.35 PC 3.78 (18) 3.09 (18) 2.42 (20) 3.09 TPDA 2.99 (21) 2.71 (21) 1.61 (22) 2.44 GES 1.01 ( 7) 0.93 ( 6) 1.22 ( 6) 1.05

C21_median_shd_results.tex; 5/08/2005; 16:01; p.1