Table VII. Average Normalized Time Results Over Common Networks.

Average Normalized Times Sample Size (SS) Average Algorithm 500 1000 5000 Over SS

MMHC 1.00 (10) 1.00 (10) 1.00 (12) 1.00 OR1 k=5 1.27 (10) 1.17 (10) 1.14 (12) 1.19 OR1 k=10 1.25 (10) 1.19 (10) 1.15 (12) 1.20 OR1 k=20 1.28 (10) 1.22 (10) 1.15 (12) 1.22 OR2 k=5 2.31 (10) 2.26 (10) 2.18 (12) 2.25 OR2 k=10 2.34 (10) 2.31 (10) 2.21 (12) 2.28 OR2 k=20 2.47 (10) 2.34 (10) 2.21 (12) 2.34 SC k=5 4.25 (10) 8.61 (10) 18.31 (12) 10.39 SC k=10 9.93 (10) 14.23 (10) 16.25 (12) 13.47 GS 4.96 (10) 12.04 (10) 10.76 (12) 9.26 PC 33.07 (10) 17.98 (10) 1.64 (12) 17.56 TPDA 11.70 (10) 5.29 (10) 0.73 (12) 5.90

Table VIII. Median Normalized Time Results Over Common Networks.

Median Normalized Times Sample Size (SS) Average Algorithm 500 1000 5000 Over SS

MMHC 1.00 (10) 1.00 (10) 1.00 (12) 1.00 OR1 k=5 1.18 (10) 1.16 (10) 1.12 (12) 1.15 OR1 k=10 1.14 (10) 1.21 (10) 1.10 (12) 1.15 OR1 k=20 1.25 (10) 1.21 (10) 1.13 (12) 1.20 OR2 k=5 2.24 (10) 2.22 (10) 2.10 (12) 2.19 OR2 k=10 2.28 (10) 2.22 (10) 2.12 (12) 2.21 OR2 k=20 2.38 (10) 2.27 (10) 2.15 (12) 2.27 SC k=5 3.90 (10) 5.59 (10) 7.04 (12) 5.51 SC k=10 8.51 (10) 10.99 (10) 8.19 (12) 9.23 GS 3.63 (10) 4.23 (10) 4.71 (12) 4.19 PC 1.60 (10) 1.21 (10) 1.15 (12) 1.32 TPDA 10.20 (10) 5.47 (10) 0.59 (12) 5.42

D11_intersect_time_results.tex; 5/08/2005; 16:35; p.1