Table XIII. Average Normalized Structural Hamming Distance Results Over Common Networks.

Average Normalized Structural Hamming Distance Sample Size (SS) Average Algorithm 500 1000 5000 Over SS

MMHC 1.00 (10) 1.00 (10) 1.00 (12) 1.00 OR1 k=5 1.36 (10) 1.59 (10) 1.90 (12) 1.62 OR1 k=10 1.34 (10) 1.45 (10) 1.98 (12) 1.59 OR1 k=20 1.38 (10) 1.57 (10) 2.07 (12) 1.67 OR2 k=5 1.16 (10) 1.42 (10) 1.81 (12) 1.46 OR2 k=10 1.18 (10) 1.42 (10) 1.82 (12) 1.48 OR2 k=20 1.23 (10) 1.44 (10) 1.88 (12) 1.51 SC k=5 1.24 (10) 1.40 (10) 1.75 (12) 1.46 SC k=10 1.26 (10) 1.35 (10) 1.35 (12) 1.32 GS 1.46 (10) 1.71 (10) 2.23 (12) 1.80 PC 3.26 (10) 2.61 (10) 2.31 (12) 2.73 TPDA 4.11 (10) 3.97 (10) 1.65 (12) 3.24

Table XIV. Median Normalized Structural Hamming Distance Results Over Common Networks.

Median Normalized Structural Hamming Distance Sample Size (SS) Average Algorithm 500 1000 5000 Over SS

MMHC 1.00 (10) 1.00 (10) 1.00 (12) 1.00 OR1 k=5 1.23 (10) 1.74 (10) 1.90 (12) 1.62 OR1 k=10 1.31 (10) 1.41 (10) 1.90 (12) 1.54 OR1 k=20 1.43 (10) 1.75 (10) 1.97 (12) 1.72 OR2 k=5 1.04 (10) 1.46 (10) 1.82 (12) 1.44 OR2 k=10 1.11 (10) 1.30 (10) 1.73 (12) 1.38 OR2 k=20 1.15 (10) 1.45 (10) 1.79 (12) 1.46 SC k=5 1.25 (10) 1.43 (10) 1.64 (12) 1.44 SC k=10 1.25 (10) 1.43 (10) 1.41 (12) 1.36 GS 1.38 (10) 1.56 (10) 2.08 (12) 1.68 PC 3.35 (10) 2.44 (10) 1.83 (12) 2.54 TPDA 3.51 (10) 2.56 (10) 1.31 (12) 2.46

D22_intersect_shd_results.tex; 5/08/2005; 16:41; p.1